0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1 User A - Pretest

X0, Y0 = trial 1 X1, Y1 = trial 2 X2, Y2 = trial 3

TRIAL 1 time 8.6 s external area 0.00 m2

TRIAL 2 time 5.55 s external area 0.00 m2

TRIAL 3 time 4.35 s external area 0.00 m2